This file is used internally by the main program.
USING HELP
{00
 
Highlighted text has a number in brackets ("<>"); just press that
number to jump to that topic.
 
At the bottom of the Help window are up to six selections:
  <P>RINT - sends the text of the current help window to the printer
  <M>AIN  - will move you to the first page of the current help session
  <B>ACK  - will move you to the previous screen
  <N>EXT  - will move you to the next screen
  <Q>UIT  - exits the help area altogether
  <H>ELP  - presents this screen
 
Just press the appropriate letter to execute that command.
 
NOTE: Depending on where you are in the help system, not all six
commands will be available.
{*
INTRODUCTION
{02
 
{B100 >>> PRESS "1" NOW FOR INFO ON HOW TO NAVIGATE THIS HELP SYSTEM <<< 
 
{cFREELY DISTRIBUTABLE SHAREWARE EVALUATION VERSION
 
This is shareware.  If you like and use this program, please register.
Registration is only $14.95+S&H (or only $12.95+S&H if you are the
first to upload this file to any BBS that has IBM software files).
 
{B203 Press "2" now for registration information and order form 
 
Registrants will receive version 2.0 of this program, which contains
the complete medical knowledge base, plus other benefits.
 
{B310 Press "3" now for more info concerning version 2.0 
{*
DISCLAIMER
{99
 
Cybernetic Physician is intended to be used as an informational and
educational resource ONLY.
 
Cybernetic Physician in not to be used, under any circumstances, to
replace the services, advice, or opinions of a qualified physician or
any other qualified health care professional, institution, or service.
 
Although all of the information in this program, is, to the best of the
publisher's knowledge, to be correct, this software is provided "AS IS",
and the publisher makes no warranty, either express or implied as to 
merchantability or fitness of purpose.
{*
REGISTRATION BENEFITS
{00
 
Registration gets you:
  1) Version 2.0 of Cybernetic Physician, which contains:
     a) The COMPLETE medical knowledge base
     b) Significant program enhancements (the ability to save and load
        profiles, the ability to save units of measure)
  2) Unlimited program support (via Email, phone, fax, mail)
 
{B109 Press "1" for order form 
 
{B204 CompuServe members, press "2" for important information! 
 
{B305 Press "3" for info on credit card ordering 
 
{B406 Press "4" for info on registering outside of the United States 
 
{B507 Press "5" for info on the $2 Discount for BBS uploads 
{*
ATTENTION COMPUSERVE MEMBERS!!
{00
 
You can register this product online on CompuServe.  It is fast, easy,
and convenient... and the fastest way to get your order.
 
To register online on CompuServe:
 
  1) At any prompt, type "GO SWREG"
  2) At menu, select item #2, "Register Shareware"
  3) Select your geographic region (U.S., Canada, Europe, Asia, etc.)
  4) At "SEARCH BY :" prompt, choose item #1, "REGISTRATION ID"
  5) When prompted for "REG ID", type: "4532"
  6) Follow onscreen prompts... that's it!  The registration fee will
      be charged to your CompuServe account; we will be immediately
      notified of your registration, and we will ship out v2.00 to you
      immediately (95%+ of orders are shipped within 24 hours of
      registration).
{*
CREDIT CARD ORDERING (VISA AND MASTERCARD)
{00
 
We have contracted the services of a reputable shareware registration
service, NorthStar Solutions, to provide Visa and MasterCard ordering.
 
Their toll-free number is: 1-800-699-6395 (U.S. only)
Outside the U.S., call   : 1-803-699-6395 
They are open 10:00am to 10:00pm Eastern Standard Time daily.
 
Ordering can also be sent to them via Email through CompuServe
(71561,2751), or through the Internet: 71561.2751@compuserve.com
 
When ordering, tell them you wish to register "Cybernetic Physician
v1.00D", what size disks you want, where you want your order shipped,
your credit card number and expiration date.
 
Please note that NorthStar handles credit card orders only; all other
forms of payment should go to Satori Publishing directly.  Also, Satori
Publishing provides the support for this software, not NorthStar.
{*
ORDERING FROM OUTSIDE THE UNITED STATES
{00
 
PLEASE NOTE THAT ALL PRICES ARE IN US$.  There is a US$3 surcharge
for international orders, to provide air mail service.
 
BY MAIL:  payment can be made by using an International Money Order,
bank draft, moneygrams from Western Union or American Express, or
cash ($US) registered mail.
 
THROUGH COMPUSERVE: if you are a member of CompuServe, you can
register online, quickly, easily, and conveniently!
 
{B104 Press "1" now for info registering online on CompuServe 
 
INTERNET E-MAIL OR TELEPHONE: If you have a MasterCard or Visa, you
can order using your credit card.
 
{B205 Press "2" for info on registering via credit card 
{*
$2 BBS UPLOAD DISCOUNT/REBATE INFORMATION
{00
 
If you are the FIRST to upload this shareware evaluation version to a
BBS which routinely has IBM files on it, you can deduct* $2 from your
registration fee.
 
Simply fill out the "$2 Discount Claim Form", and return it along with
your registration.  On the main Order Form, mark "-$2" on the "Less any
credit due you" line, and subtract $2 from the total.
 
Upon receipt, we will check our database to make sure no one else has 
claimed uploading the file to that specific BBS.  If not, your name will
be added to the database.
 
{B108 Press "1" for the "$2 BBS Upload Discount Claim Form"
 
*orders received through online CompuServe or credit card registrations
will receive a Rebate Form with their order, and will be eligible for a
rebate, instead of a discount.
{*
$2 BBS Upload Discount Claim Form
{00
 
I certify that:
  1) I have uploaded the file "CP100D.ZIP" to the following BBS:
     NAME OF BBS: ___________________________________________________
     PHONE NUMBER OF BBS: __(_________)______________________________
     CITY, STATE OF BBS: ____________________________________________
  2) To the best of my knowledge, I am the first person to upload this
     file to the above-mentioned BBS; and
  3) The above-mentioned BBS routinely has IBM files on it for 
     downloading.
 
              Sign here: ____________________________________________
 
              Print your name here:__________________________________
 
              Date (Month, day, year): _______________________________
{*
REGISTRATION ORDER FORM (IBM VERSION)
{00
Name ____________________________________________________________________
Address _________________________________________________________________
City _____________________ State/Prov ___________ Zip/Post Code _________
Country _______________________ Email (optional) ________________________
 
--Shipping/handling--                                   Price:     $14.95
U.S.A.        :  $1  \                      If C.O.D., add $3:  +
Canada/Mexico :  $2   >-----------------Add shipping/handling:  +
All other     :  $3  /                Less any credit due you:  -
                                    Indiana residents, add 5%:  +
Check one:                                              TOTAL:  =
   [  ] PREPAID: Make checks/money order payable to "Satori Publishing"
   [  ] C.O.D. : $3 surcharge, U.S.A. only... fax or Email your order!
Check one:  [  ] 3.5" Disks (DSDD)   [  ] 5.25" Disks (DSDD)
 
Mail to: Satori Publishing, PO Box 8566, Michigan City, IN  46361 U.S.A.
Phone/fax : (219) 879-1309         GEnie   : DuneWalker
CompuServe: 72124,3074             Internet: dunewalker@genie.geis.com
{*
VERSION 2.00 INFORMATION
{00
 
Version 1.00D, the shareware evaluation version you are now using,
contains only a fraction of the medical knowledge base of version 2.00D.
 
Version 2.00D knowledge base includes:       
  * Diseases and ailments of infants
  * Diseases and ailments of children
  * Diseases and ailments of the elderly
  * Female-specific ailments and diseases
  * Male-specific ailments and diseases
  * General ailments and diseases, such as:
       * Problems of the back, knees, neck, arms, hand, or feet
       * Eye, ear, and mouth problems
       * Hair and skin problems
       * and much more!
 
Version 2.00D also contains program enhancements, such as allowing you
to save and load profiles and units of measurement.
{*
HELP
{00
 
{b100 Using Help 
 
{b213 Quick Tutorial 
 
{b314 Menu Items 
 
{b433 Bug Reports and Suggestions
{*
QUICK TUTORIAL
{00
 
The basic steps to use this program are:
  1) Use NEW PROFILE to enter in the subject's age, weight, etc.
  2) After a profile is in memory, choose: PROJECT/INTERROGATE.
     You will be shown a subject history and symptom list to fill out,
     followed by a questionnaire.  Finally, an attempted diagnosis.
 
TIP: Use UNITS to switch between English and metric units, as desired.
{*
MENU ITEMS
{00
 
{b117 Main 
 
{b223 Project 
 
{b330 Units 
{*
MAIN/
{00
 
{b118 About 
 
{b219 Register 
 
{b320 Disclaimer 
 
{b421 DOS Shell 
 
{b522 Quit 
{*
MAIN/ABOUT
{00
 
This invokes a message box containing information about the program,
version number, and memory resources available.
{*
MAIN/REGISTER
{00
 
This invokes a series of help screens describing the program and
how to register it.
{*
MAIN/DISCLAIMER
{00
 
This invokes a help screen concerning important information about
this program, its uses, and its limitations.
{*
MAIN/DOS SHELL
{00
 
This allows you to temporarily exit Cybernetic Physician, and enter
the DOS environment.  Type "exit" to return to the program.
{*
MAIN/QUIT
{00
 
After verifying, this causes the program to terminate.
{*
PROJECT/
{00
 
{b124 New Profile 
 
{b225 Edit Profile 
 
{b328 Close Profile 
 
{b429 Interrogate 
{*
PROJECT/NEW PROFILE
{00
 
This opens up a dialog box which is to be used to input the subject's
name, year of birth, height, weight, and sex.
 
NOTES: 
  1) All fields must be filled out before the profile is accepted.
  2) If you are unfamiliar with the units of measure, you can use
     UNITS to change to English or metric units.
  3) When entering the year, use the full year; for example, type 
     "1995", not "95".
{*
PROJECT/EDIT PROFILE
{00

This opens up the subject profile dialog box, currently filled with the
data of the profile currently in memory.
 
As in PROJECT/NEW PROFILE, you can enter or edit existing information.
{*
PROJECT/CLOSE PROFILE
{00
 
This will, upon confirmation, close (remove) the current profile in
memory.
{*
PROJECT/INTERROGATE
{00
 
This is the heart of the program.  Once a profile is in memory by
entering in the profile (using PROJECT/NEW PROFILE) the expert system
query, or interrogate, can begin.
 
First, you will be shown a complaint list.  Find the major complaint of
the subject.  Next, you will be shown a history list and a symptom list.
Once you have filled those out, you will be asked questions, which you
must respond by typing "y" (yes) or "n" (no).
 
Finally, the program will attempt to diagnose the ailment.
{*
UNITS
{00
 
This allows you to easily switch back and forth between English units
(pounds, inches, degrees Fahrenheit) and metric units (kilograms, 
centimeters, and degrees Celsius.
{*
BUG REPORTS AND SUGGESTIONS
{00
 
We are always interested in bug reports, from any user, registered
or not... no questions asked.  All we ask is that when you a report
a bug, mention:
   1) What type of computer are you using (XT?  386?  486?, etc.)
   2) What operating system (5.0?  6.22?)
   3) Using the menu item MAIN/ABOUT, report the free memory values
   4) What were you doing when the bug happened, and what occurred
 
We are also anxious to hear about suggestions as to how to improve the
program.
 
Please send bug reports and suggestions to us:
Email:  dunewalker@genie.geis.com (Internet); DuneWalker (GEnie);
        72124,3074 (CompuServe)
Fax:    (219) 879-1309
Mail:   Satori Publishing, PO Box 8566, Michigan City, IN  46361 USA
{*
DISCLAIMER
{00
 
Cybernetic Physician is intended to be used as an informational and
educational resource ONLY.
 
Cybernetic Physician in not to be used, under any circumstances, to
replace the services, advice, or opinions of a qualified physician or
any other qualified health care professional, institution, or service.
 
Although all of the information in this program, is, to the best of the
publisher's knowledge, to be correct, this software is provided "AS IS",
and the publisher makes no warranty, either express or implied as to 
merchantability or fitness of purpose.
{*
REGISTRATION INFORMATION
{00
 
{cFREELY DISTRIBUTABLE SHAREWARE EVALUATION VERSION
 
This is shareware.  If you like and use this program, please register.
Registration is only $14.95+S&H (or only $12.95+S&H if you are the
first to upload this file to any BBS that has IBM software files).
 
{B103 Press "1" now for registration information and order form 
 
Registrants will receive version 2.0 of this program, which contains
the complete medical knowledge base, plus other benefits.
 
{B210 Press "2" now for more info concerning version 2.0 
{*



